
# This array holds the set of VME address to test

vme_addr_arr += ( "0x00700104",
                  "0x00700106",
                  "0x00700108",
                  "0x0070010a",
                  "0x0070010c",
                  "0x0070010e",
                  "0x00700110",
                  "0x00700112",
                  "0x00700114",
                  "0x00700116",
                  "0x00700118",
                  "0x0070011a",
                  "0x0070011c",
                  "0x0070011e",
                  "0x00700120",
                  "0x00700122"  )
