
# This array holds the set of VME address to test

vme_addr_arr += ( "0x00700060",
                  "0x00700062",
                  "0x00700064",
                  "0x00700066",
                  "0x00700068",
                  "0x0070006a",
                  "0x0070006c",
                  "0x0070006e",
                  "0x00700070",
                  "0x00700072",
                  "0x00700074",
                  "0x00700076",
                  "0x00700078",
                  "0x0070007a",
                  "0x0070007c",
                  "0x0070007e" )
