
# This array holds the set of VME address to test

vme_addr_arr += ( "0x00780104",
                  "0x00780106",
                  "0x00780108",
                  "0x0078010a",
                  "0x0078010c",
                  "0x0078010e",
                  "0x00780110",
                  "0x00780112",
                  "0x00780114",
                  "0x00780116",
                  "0x00780118",
                  "0x0078011a",
                  "0x0078011c",
                  "0x0078011e",
                  "0x00780120",
                  "0x00780122"  )
