
# This array holds the set of VME address to test

vme_addr_arr += ( "0x00780060",
                  "0x00780062",
                  "0x00780064",
                  "0x00780066",
                  "0x00780068",
                  "0x0078006a",
                  "0x0078006c",
                  "0x0078006e",
                  "0x00780070",
                  "0x00780072",
                  "0x00780074",
                  "0x00780076",
                  "0x00780078",
                  "0x0078007a",
                  "0x0078007c",
                  "0x0078007e" )
