R=2971

Z = 3424

Envelope for

Scintillators at Z = 3492 for R < 2883

Z = 3520

Ext. Barrel End Plate

Plug Section I

Z = 3404

(source tubes)

R=2883

45ßProposed envelope for fibers from ITC scintillators