Dimensions are in mm with a tolerance of – 0.1 unless stated otherwise. Dimensions in parentheses are in Inches

ATLAS ITC Scintillator

R. Miller

DRAWN

DATE

PROJECT

MATERIAL

TITLE

DWG. NO

SCALE

MICHIGAN STATE UNIVERSITY

HIGH ENERGY PHYSICS REV HEP-B-025

289247224397Bend

Up 31ß

Bend Down 90ß

54102803809990ß261Part is symmetric about center line

243 typ.

3.5 dia. typ.

(4 places)

30Dimensions are in mm with a tolerance of –1 mm

1:2Shipping Cover

20 Ga Aluminum

7-15-98

-378Views after Bending (Scale 1:4)

Bend

Down 31ß

Bend Up 90ß