Dimensions are in mm with a tolerance of – 0.1 unless stated otherwise. Dimensions in parentheses are in Inches

ATLAS ITC Scintillator

R. Miller

DRAWN

DATE

PROJECT

MATERIAL

TITLE

DWG. NO

SCALE

MICHIGAN STATE UNIVERSITY

HIGH ENERGY PHYSICS REV HEP-B-025

9-2-98

Right Fiber Guide

(4x2x1/4)Alum. Angle

1:1C75–1

50–1151340–170–135–1A2.8ß(2) holes thru4.5 (3/16) dia.30830

12SECTION A-A

-374Drill & tap 6-32

8 – 1 deep104Thisoverlaparea isthrough26 – 150 – 1 Radius12.7 (1/2)Dia. typ.134 mmremovedfrom backsurface inthis area40 – 110 mm (3/8) dia.milled parallel toopposite surface(2 places)50 – 14 mm removedfrom front surfacein this area(Taper OK in this range)

Fillet OK

6.5 – 1