Dimensions ( inches – 1/16)

Roll width

Printed Bar

Repeat

Final

Item #

(W)Length (L)

Width (B)

Distance (R)

Width (S)

198.5

0.5

8 3/4

8 1/4

298.5

9 1/8

398.5

0.9

9 1/2

411 3/8

11.0

0.8

9 7/8

10 5/8

511 3/8

1.2

10 3/8

6113/8

10 7/8

71312.7

11 1/2

12 3/16

81312.7

1.6 12 91312.7

2.0

12 5/8

1016 1/8

15.7

2.7

13 1/4

15 5/16

1116 1/8

3.5 14 WLRBSPrinting of Masks for Tilecal Sleeves

10-24-97

R. J. Miller